%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{15}

\bibitem{Gohns2002} Gohns, A. (2002). Management of opioid substitution treatment in the primary health care setting: A national training course for service providers. \textit{Full text online from the Royal New Zealand College of General Practitioners{\textquoteright} website}, \textit{29}(3), 172--175.

\end{thebibliography}

\end{document}

