%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ho+Mok2003} Ho, T., \& Mok, J. (2003). Condensate clearance from CPAP circuit: An examination of two methods of draining condensate from the inspiratory tubing. \textit{Journal of Neonatal Nursing}, \textit{9}(4), 117--120.

\end{thebibliography}

\end{document}

